Software Status

Murrough Landon – 2 June 2004

http://www.hep.ph.qmul.ac.uk/∼landon/talks

Contents

• Recent developments • Possible changes

RAL, 2 June 2004 1 Murrough Landon, QMUL

Recent developments (1) PPM • Work on module services continues. Some changes required to style used for

other modules to cope with ASIC/RemFPGA communication protocol

• New VMEBus (using programmed IO) to handle A24 and A32 access • Database code (XML tree) exists, but needs to be moved to database package

to be used by the simulation

• PPM simulation finished apart from integration with the database (NB many

settings)

JEM1

• New JEM services package prepared - but incompatible with old JEM • Old JEM software needs to be renamed and kept as fallback – may need to use

both at the same time

RAL, 2 June 2004 2 Murrough Landon, QMUL

Recent developments (2) ROS • In continuous normal use • More reliable with recent dataflow software

Monitoring

• Adrians work now (almost) in CVS/CMT • Still need bytestream decoding and analysis

CVS • Recent activity has been hindered by loss of access to CVS

RAL, 2 June 2004 3 Murrough Landon, QMUL

Possible changes

Online/Dataflow

• Will soon move to latest (testbeam) versions. OK at RAL

ROD crate DAQ

• Still being investigated. May try to migrate in week of 14 June??

Conditions Database

• Desirable but may be too much work for the testbeam

RAL, 2 June 2004 4 Murrough Landon, QMUL