Workshops and Working Groups

Murrough Landon – 6 March 2003

http://www.hep.ph.qmul.ac.uk/∼landon/talks

Overview

• Recent DIG meeting(?) • Recent database workshop • ROD crate DAQ workshop (26 March) • Monitoring • Error handling and fault tolerance

Mainz, 6 March 2003 1 Murrough Landon, QMUL

DIG Meeting

ROD contracts?

Mainz, 6 March 2003 2 Murrough Landon, QMUL

Database Workshop (1)

Survey of databases in ATLAS: TC

• Technical coordination: installation databases

– Will have full details of every component and subcomponent, eg cables, modules, etc installed in the cavern and USA15 – legal requirement for decommissioning – Defines pieces of equipment and functional locations – Will track locations (movement of spares etc) – “equipment passports” – Will (aim to) take copies of production databases or at least provide some common access to them? Excel templates for massive upload of data.

– Not sure if small projects could use it as their own production database? – All to be presented via EDMS interface

Mainz, 6 March 2003 3 Murrough Landon, QMUL

Database Workshop (2)

Survey of databases in ATLAS: others

• DCS database • Example detector database (muons) • Example TDAQ database (l1calo) • Online configuration • HLT view • Offline views (simulation, reconstruction, analysis)

Mainz, 6 March 2003 4 Murrough Landon, QMUL

Database Workshop (3)

Conditions database

• Presentations by detectors (LAr, Muon) • LHCXX common project for conditions database • ATLAS offline view (IoV layer over POOL/ROOT) • Lisbon prototype • GRID access • Coherence of conditions and configuration data? • Lots of discussion: not so sure about the convergence...

Mainz, 6 March 2003 5 Murrough Landon, QMUL

Database Workshop (4)

L1Calo viewpoint

• Reprise of common level 1 requirements (web page prepared by Thorsten

Wengler last september and circulated to at1soft list)

http://cern.ch/Atlas/GROUPS/DAQTRIG/LEVEL1/software/level1 databases.html

• Outline of L1Calo configuration data (with rough data sizes)

– calibrations: energy, pulse shape, timing – crates, modules, cables, mapping to calorimeter channels – hot and dead cell map – firmware binaries (ideally not just pointers to files) – multiple parallel versions required

Mainz, 6 March 2003 6 Murrough Landon, QMUL

Database Workshop (5)

L1Calo viewpoint (continued)

• Conditions data (less well defined, especially numerically)

– store the complete conditions of each run – cf common view that conditions DB should only hold what is of interest to the offline – data from monitoring (histograms, statistics etc)

• Feedback on present configuration database

Mainz, 6 March 2003 7 Murrough Landon, QMUL

Forthcoming ROD Crate DAQ Workshop

Ralf wants me to talk about our experience with the Online configuration database...

Mainz, 6 March 2003 8 Murrough Landon, QMUL

Monitoring (1)

Working group

• Members: Francois Touchard, Hanspeter Beck, Sergei Kolos, Beniamino di

Girolamo and me

• Aim to produce TDR chapter and backup document – continue to worry about

monitoring after the TDR too...?

• Draft backup document prepared (still somewhat of a draft) • TDR chapter will be distilled from this • TDAQ network group are very keen to get numerical input about the “monitoring

matrix”, ie traffic between various sources and destinations of monitoring data

• Problem: detectors (and trigger groups) are busy and not particularly concerned

by the DAQ/HLT TDR timescale

• Monitoring workshop held during ATLAS week: some input (mostly verbal, not

talks) from detectors but no numbers

Mainz, 6 March 2003 9 Murrough Landon, QMUL

Monitoring (2)

L1Calo perspective

• Existing document from Eric

http://www.hep.ph.qmul.ac.uk/l1calo/doc/pdf/MonReqs.pdf

• Very detailed on some requirements, but not much on where and how much • We should try to expand on this area • And guess at some numbers...

Where to monitor

• Monitoring at SFI/EF level and via ROD crate DAQ will be the most useful

places for normal ATLAS physics running

• Monitoring via the ROS is needed for testing and installation • Some calibrations expected to be done at ROD crate level (events monitored via

ROD crate DAQ or maybe on board DSPs)

• Other calibrations will require dedicated EF tasks (or offline)

Mainz, 6 March 2003 10 Murrough Landon, QMUL

Monitoring: Trigger Decision

Check the level 1 trigger is functioning correctly

• For the calorimeter trigger, monitor the whole chain from calorimeter analogue

electronics, through receiver stations, preprocessor, cluster and jet/energy processors to the CTP

• Use full calorimeter readout, readout from the preprocessor and later stages of

the trigger pipeline

• Simulate the trigger functionality on a subset of events and look for errors • Full simulation needs the full event: ie via SFI or on dedicated EF nodes • Check both accepted events and sample of rejected events (selection of

suitable monitoring triggers needs more thought)

• Partial simulation (of the digital trigger electronics from the preprocessor

onwards) could be done on event fragments collected via ROD crate DAQ (if that supports coherent samples across 2–3 ROD crates) [Livio: “use ROS”]

Mainz, 6 March 2003 11 Murrough Landon, QMUL

Monitoring: Trigger Hardware

Monitor operational aspects of the trigger

• Check for levels of crosstalk, measure bit error rates on links and across

backplanes, reliability of links, etc using both hardware monitoring via VME at O(1Hz) and event data (some overlap with trigger decision monitoring, but not all errors may affect the resulting L1A)

• Measure “level 0” rates and energy spectrum in each trigger tower:

preprocessor hardware histogram per tower read by the crate CPUs (at >10Hz, but published less frequently)

• Rapid detection of new hot or dead cells, also indication of real beam conditions • Check current calibrations are still optimal • Readout related aspects: buffer utilitisation, etc • Physical quantities (crates, temperatures, voltages, etc) via DCS

Mainz, 6 March 2003 12 Murrough Landon, QMUL

Monitoring: Trigger Rates and Performance

Detailed monitoring of rates and deadtime

• Trigger rates through the system: primitives (internal calo/muon details), CTP

inputs, prescales, deadtime, final trigger “items”, etc

• Rates per trigger tower (efficiency across eta-phi space) • Correlations between trigger rates • Correlations of trigger rates with beam conditions, etc • History plots • Etc...

Trigger performance

• Detailed studies will be mainly done offline, but some online checks may also be

useful?

Mainz, 6 March 2003 13 Murrough Landon, QMUL

Monitoring Matrix

Impact of monitoring on the network

• We will surely use all available resources for monitoring – not sure what we

absolutely need (and network bandwidth may not be the limiting factor)

• Some expected traffic flows (no numbers yet):

– RODs (might have network interfaces?) to local workstations?? – crate CPUs to local workstations (hardware monitoring, ROD events) – local workstations to central displays (histograms from local monitoring) – events to EF tasks – histograms/statistics from EF tasks to EF histogram collection – various sources saving data to conditions database

Mainz, 6 March 2003 14 Murrough Landon, QMUL

Error Handling and Fault Tolerance (1)

Working group

• Members: Doris Burckhart, Andre Bogaerts, Reiner Hauser, Beniamino di

Girolamo and me

• Aim to produce TDR chapter and backup document • Draft TDR chapter prepared (available via DAQ/HLT TDR page) • Backup document will be an expansion of this

Mainz, 6 March 2003 15 Murrough Landon, QMUL

Error Handling and Fault Tolerance (2)

Topics covered

• Error message handling: transport and filtering (MRS) • Classification of errors (FATAL, ERROR, WARNING, “INFO”) – also diagnostic

and debug messages

• Handling of errors: distributed expert systems proposed

– Hierarchy probably matching that of the run control – Handle errors as close to their origin as possible (and if fixed, report successful “INFO”) – If not handled, pass to higher level, which may need to pass requests for actions back down again – Fault tolerance: identify single points of failure, make recommendations on achieving fault tolerance within each subsystem (eg error in one component should not affect neighbouring components)

• Try to collect error handling scenarios from subsystems

Mainz, 6 March 2003 16 Murrough Landon, QMUL

Error Handling and Fault Tolerance (3)

L1Calo scenario: dealing with a hot cell

• Possible case for passing errors up and down different error handling and run

control hierarchies

• Hot cell detected (very quickly?) by PP rate monitoring → error message • PP could suppress the tower automatically → Conditions DB update? • Perhaps also seen quickly by calo monitoring if its a faulty component? • SFI/EF monitoring will (later) also see the hot cell in whole event data – or

maybe by watching for Conditions DB updates or PP error messages??

• Only SFI/EF can determine if its a component calo cell or trigger tower • If the former, the SFI/EF monitoring reports this and request PP system to

reenable the tower (another Conditions DB update?)

• If calo monitoring already suppressed the cell, later SFI/EF request can be

ignored

Mainz, 6 March 2003 17 Murrough Landon, QMUL