Racks, Crates and Cables

Racks and crates

• Do we want a separate rack each side for patch panels? • Needs a decision on whether we use patch panels or “octopus cables” • Deflectors for cooled air will be riveted in: we need to decide on exact crate

locations within racks soon! Cables

• No work on cabling document since the summer (due last April!) • Bill Cleland offered (last November) to update our spreadsheets with his

corrections – so far we have received nothing back

• Chris Parkmans wants details of cables within USA15 for his database – book

space in cable trays

• Do we have enough short cables within USA15 (for patch panels and/or octopi)?

Mainz, 5 March 2003 1 Murrough Landon, QMUL