Software Status 1 Murrough Landon

Software Status

Murrough Landon – 19 April 2001

http://www.hep.ph.qmw.ac.uk/~landon/talks

Overview

• TDAQ week highlights • Software status • Documentation • Hardware

Software Status 2 Murrough Landon

TDAQ Week Highlights

Online Software

• Continued rollout of new releases • Easier for subdetectors to add customisations • Event dump improving (usable by June?)

• TileCal have a monitoring offering – may not be general enough to be useful though

Dataflow/ROS

• ROS on a PC available (one Slink only) – it was used for MIROD and CPROD tests • Extension to several Slinks expected... • ROD crate DAQ now a DIG responsibility DIG • DIG now part of Technical Coordination and to be run by Livio Mapelli

Level 1 Software

• Aim for coordinate/discussion across level 1 • Some attention to software process and quality, documents, reviews, etc • Video conference end May/early June?

Software Status 3 Murrough Landon

Software Status (1)

Test Vectors

• Bill has been ill, so not much progress, alas

Run Control

• Some work done on databases (trigger menu, calibration) • Need to sort out overlaps with work on readout • Need to decide on hardware access library

Readout

• Focus has been on ROD tests • Medium/long term strategy to be decided: focus on PC ROS vs work on our own ROD crate DAQ • Above (run control) comments also apply

Software Status 4 Murrough Landon

Software Status (2)

Monitoring/Simulation

• Steve is preparing an overall framework...

Histogramming

• Some ATLAS/Online/LVL2 proposals now available as a document.

• We should monitor progress with this...

• ...meanwhile we still have the ROOT based package modified by Tara from CDF code

HDMC

• Oliver will start in June • We have discussed use of HDMC as a hardware access library for DAQ type code • Set of changes to make this easier have been proposed

http://www.hep.ph.qmw.ac.uk/l1calo/doc/pdf/HdmcChanges.pdf

Software Status 5 Murrough Landon

Documentation

Software website

• Software website revamped

http://www.hep.ph.qmw.ac.uk/l1calo/sweb

• Kept in CVS to allow easier updates by widely scattered software developers

Documents

• Several draft documents now exist on various aspects of slice test related software development

www.hep.ph.qmw.ac.uk/l1calo/sweb/documents/doclist.html

• Recent additions: calibration; databases; HDMC changes

• Feedback welcome

Software Status 6 Murrough Landon

Hardware

Crate CPUs

• Three more Concurrent Technologies CPUs have now been ordered • However a newer version (compared to the QMW one) is available with better bus error handling (but no SCSI) • Order is being held until we decide which we want

ATLAS Readout System on a PC

• Status of our Slink order?

• When we have the hardware, get PC ROS code from CERN and try it on one of our PCs...