Software Status 1 Murrough Landon

Software Status (1)

Murrough Landon – 27 October 1999 Summary of recent work

• Discussions on future software • Use of software “pieces” • Move to Linux platforms • Work with TTCvi

Future DAQ Software

• Calibration section of Requirements Document updated • Still needs more understanding of numerical requirements • Understanding of database organisation (also with CTP, Muons) • Started work on “Use Cases” for data acquisition • Outline design for short term DAQ system for ROD and prototype modules (in the absence of suitable components from DAQ -1 project)

L1 UK Meeting 27 October 1999 Birmingham

Software Status 2 Murrough Landon

Software Status (2)

Investigated Available Software

• Many “Back End” DAQ -1 components have now been tried successfully • Useful interaction with members of the CERN DAQ group • Heidelberg software installed - some problems getting it going • Successful use of ROOT (distributed OO histogramming package)

Linux Platforms

• Aim for Linux systems at QMW (exists), RAL (imminent), Bham (soon?)

• VME access via network initially • Other options still open

Work on TTCvi

• TTCvi incorporated into existing diagnostic software • Not yet tried with Heidelberg software • High level design of TTCvi classes under discussion

L1 UK Meeting 27 October 1999 Birmingham