Software: DSS

Diagnostics

• ∼ All there for some time now (except update for last programming model changes) • Short user guide to be written • Operations on memories are a bit slow DAQ • ∼ All code has now been written and is being tested • daqctl: menus set run parameters OK • daqprod: runs properly and generates events on interrupt; minor bug to be fixed • event dump: event format looks sensible • daqana: histogramming still to be tested • Tested on VIC with 1/3 of DSS memory

Hardware & Software

Platforms

Software

• Chris Bee asked which OS and compilers we are using now and which we intend to use in the next 18 months

• Response drafted with input from most groups

• Little commonality between all six groups

• Linux seems the most likely future platform

• Provokes strong reactions, esp in connection with...

Hardware & Software

Platforms

Hardware

• (Heated!) discussion on possible replacement for 68K based LynxOS systems • Atlas DAQ support for some options:

– VME based PC (VMIC 7587) – Desktop PC with SBS-Bit3 617 PCI- VME interface

• No concensus in UK even - discuss again at joint meeting

Software: Other Matters

Calibration: We are gathering information (and more questions) on how we will carry out the various calibration tasks.

Tools: We have been using CVS (a bit). We are looking at software CASE tools (StP).

Readout issues: Various smaller discussions on CPM readout. Schemes proposed and discarded. Progress on the ROD end too.

Future DAQ: Starting to think about future DAQ systems and how to evolve towards using ATLAS DAQ software - eg for ROD tests?

Future Diagnostics: Still needs to be discussed... (Mainz are using the HD software for JEM-2 tests).