More Experience with DAQ -1 1 Murrough Landon

More Experience with DAQ -1

Murrough Landon – 27 October 1999

• Previous meeting: 0.0.5 CD installed, tried IS, MRS; problems running the noddy DAQ system.

• Now tried version 0.0.6 via AFS to CERN; also tried some corrected scripts for the 0.0.5 version

• (Mostly) successfully worked through the Run Control tutorial - minor problems reported to Bob Jones.

• Initial problems with updated “noddy DAQ system” test.

My typo in editing the configuration database eventually spotted by Bob Jones. After that it worked as advertised.

• Noddy run controller built from the example skeleton. Modified with some extra print statements and run via the RC tutorial script.

Next steps

• Try Integrated GUI; process manager.

• Start giving serious thought to design of ROD DAQ system!

L1 UK Software Meeting 27 October 1999 Birmingham