Meetings at CERN

DIG Meeting

• Level 2 studying the optimal organisation of FEs into RODs (SCT, Pixels, LAr)

• Detector requirements document is out of date. Subdetectors should look at it and send updates.

• DAQ group (Dave Francis) looking for input/encouragement for extending DAQ- 1 functionality into the ROD crate.

ROD Meeting

• Proposal to use BCRESET to reset errors (every few seconds? minutes?)

• ROD crate standard: VME 64ext. Proposal for a bulk order of 9U crates if we can acheive as much commonality as possible, eg power supply, backplanes, minimal monitoring/controls (use DCS).